\begin{slide}[toc=F: frequencies]{F = Weighted Frequencies (100=  max frequency)}
\begin{center}
{\tiny
\begin{tabular}{rl|rl}
1.1&            Management and Planning of IV\&V&100&********************\\
1.5 &    Management \& Technical Review Support&100&********************\\
1.6 &                     Criticality Analysis&100&*******************\\
1.2 &                   Issue and Risk Tracking&96&******************\\
1.3 &                  Final Report Generation&96&******************\\
1.4 &                         IV\&V Tool Support&96&******************\\\cline{1-2}

3.1&      Traceability Analysis -  Requirements&90&*****************\\
4.4&                 Software FQT Plan Analysis&88&****************\\
6.1 &              Traceability Analysis - Test&88&****************\\
4.1&             Traceability Analysis - Design&81&***************\\
5.1&               Traceability Analysis - Code&81&***************\\
5.10&               Component Test Case Analysis&81&***************\\
2.1 &                           Reuse Analysis*&71&*************\\\cline{1-2}

2.3 &                System Requirements Review&54&*********\\
3.2&           Software Requirements Evaluation&54&*********\\

3.3&          Interface Analysis - Requirements&53&*********\\
5.2&   Source Code and Documentation Evaluation&53&*********\\
5.3&                  Interface Analysis - Code&53&*********\\

2.2 &          Software Architecture Assessment&50&********\\
3.4&                  System Test Plan Analysis&50&********\\\cline{1-2}

4.6&                          Database Analysis&35&******\\
4.2&                 Software Design Evaluation&31&*****\\
5.4&                  System Test Case Analysis&26&****\\
5.5&                 Software FQT Case Analysis&26&****\\
6.4&               System Test Results Analysis&26&****\\
6.5&              Software FQT Results Analysis&26&****\\\cline{1-2}

2.4&                Concept Document Evaluation&13&*\\
2.5&   SW/User Requirements Allocation Analysis&13&*\\
2.6&                      Traceability Analysis&13&*\\
4.3&                Interface Analysis - Design&9&

\end{tabular}
}
\end{center}
\end{slide}
\begin{slide}[toc=]{F = Weighted Frequencies (more)}
\begin{center}
{\tiny
\begin{tabular}{rl|rl}
3.5&              Acceptance Test Plan Analysis&5&\\
4.5&    Software Integration Test Plan Analysis&5&\\
5.7&              Acceptance Test Case Analysis&5&\\
5.9&       SW Integration Test Results Analysis&5&\\

5.12&           Software FQT Procedure Analysis&3&\\
5.11&            System Test Procedure Analysis&3&\\
6.3&                        Simulation Analysis&3&\\
7.1&             Operating Procedure Evaluation&3&\\
7.2&                         Anomaly Evaluation&3&\\
7.3&                       Migration Assessment&3&\\
7.4&                      Retirement Assessment&3&\\\cline{1-2}

3.6&                 Timing and Sizing Analysis&0&\\
4.7&               Component Test Plan Analysis&0&\\
5.6&          SW Integration Test Case Analysis&0&\\
5.8&     SW Integration Test Procedure Analysis&0&\\
6.2&                   Regression Test Analysis&0&
\end{tabular}
}
\end{center}

~\\

\begin{itemize}
\item Assess current capabilities: 
\bi
\item
how well do we do the most frequent tasks
seen in current practice?
\ei
\item Gap analysis:
\bi
\item
what aren't we doing now that we will be doing more of  
in the future? Are we ready for that jump?
\ei
\end{itemize}
\end{slide}

\begin{slide}[toc=C: costs]{C = Weighted Total Budgeted Costs (100=  max cost)\newline(only shows recently performed WBS tasks)}
\begin{center}
{\tiny
\begin{tabular}{rl|rl}
1.1&            Management and Planning of IV\&V&100&********************\\
5.2&   Source Code and Documentation Evaluation&48&*********\\\cline{1-2}
1.2&                   Issue and Risk Tracking&28&*****\\
5.3&                  Interface Analysis - Code&23&****\\
1.5&    Management \& Technical Review Support&22&****\\
4.2&                 Software Design Evaluation&18&***\\
3.2&           Software Requirements Evaluation&18&***\\\cline{1-2}
6.5&              Software FQT Results Analysis&13&**\\
4.4&                 Software FQT Plan Analysis&12&**\\
4.1&             Traceability Analysis - Design&11&**\\
6.1&              Traceability Analysis - Test&10&**\\
1.4&                         IV\&V Tool Support&10&**\\
6.4&               System Test Results Analysis&9&*\\
6.3&                        Simulation Analysis&9&*\\
5.5&                 Software FQT Case Analysis&9&*\\
4.3&                Interface Analysis - Design&9&*\\\cline{1-2}
3.3&          Interface Analysis - Requirements&7&*\\
2.3&                System Requirements Review&7&*\\
3.4&                  System Test Plan Analysis&6&*\\
3.1&      Traceability Analysis -  Requirements&6&*\\\cline{1-2}
5.9&       SW Integration Test Results Analysis&4&\\
5.4&                  System Test Case Analysis&4&\\
2.1&                           Reuse Analysis*&4&\\
1.6&                     Criticality Analysis&4&\\
5.7&              Acceptance Test Case Analysis&3&\\
5.1&               Traceability Analysis - Code&3&\\
2.2&          Software Architecture Assessment&3&\\
1.3&                  Final Report Generation&3&\\
6.2&                   Regression Test Analysis&2&\\
4.5&    Software Integration Test Plan Analysis&1&\\
3.5&              Acceptance Test Plan Analysis&1&\\
\end{tabular}
}
\end{center}
\end{slide}


\begin{slide}[toc=F*C: Freq*Costs]{C*F = Cost*Frequency (100=  max F*C)\newline(only shows non-zero entries)}
Using current known costs, and assuming current project types, then the most frequently seen {\em and} most
cost WBS tasks.
\begin{center}
{\tiny
\begin{tabular}{rl|rl}
1.1&            Management and Planning of IV\&V&100&********************\\\cline{1-2}
1.2&                   Issue and Risk Tracking&26&*****\\
5.2&   Source Code and Documentation Evaluation&25&*****\\
1.5&    Management \& Technical Review Support&22&****\\\cline{1-2}
5.3&                  Interface Analysis - Code&12&**\\
4.4&                 Software FQT Plan Analysis&10&**\\
3.2&           Software Requirements Evaluation&9&*\\
1.4&                         IV\&V Tool Support&9&*\\
6.1&              Traceability Analysis - Test&8&*\\
4.1&             Traceability Analysis - Design&8&*\\\cline{1-2}
4.2&                 Software Design Evaluation&5&*\\
3.1&      Traceability Analysis -  Requirements&5&*\\
1.6&                     Criticality Analysis&4&\\
6.5&              Software FQT Results Analysis&3&\\
3.4&                  System Test Plan Analysis&3&\\
3.3&          Interface Analysis - Requirements&3&\\
2.3&                System Requirements Review&3&\\
6.4&               System Test Results Analysis&2&\\
5.5&                 Software FQT Case Analysis&2&\\
5.1&               Traceability Analysis - Code&2&\\
2.1&                           Reuse Analysis*&2&\\
1.3&                  Final Report Generation&2&\\
5.4&                  System Test Case Analysis&1&\\
2.2&          Software Architecture Assessment&1&\\
\end{tabular}
}
\end{center}

These are the IV\&V tasks most in need of optimization.

Note: 22 of the 45 WBS tasks do {\em not} appear in the above list.
\end{slide}
