
%%% Local Variables: 
%%% mode: latex
%%% TeX-master: t
%%% End: 

\section{Experiments}
In the sequel we will refer to WHICH2, WHICH4, and WHICH8.
These refer to different versions of WHICH that
are hard-wired to divide continuous ranges into 2,4,8 bins (respectively).


\PARstart{I}{n} the following
