\begin{figure}
\begin{center}
\begin{tabular}{p{0.5in}|p{0.3in}|p{0.3in}|p{0.3in}|p{0.3in}|p{0.3in}|p{0.3in}|p{0.3in}|p{0.3in}|p{0.3in}}\cline{2-6}
\multicolumn{1}{c}{~}& \multicolumn{5}{|c|}{Percentage of modules with $N$ defects}\\\cline{2-6}
$N$ defects& cm1 & kc1 & kc3 & mw1 & pc1\\\hline
1\newline
2\newline
3\newline
4\newline
5\newline
6\newline
7\newline
8\newline
9\newline
10\newline
11\newline
12
&
10.67\newline
02.17\newline
01.19\newline
00.99\newline
00.40\newline
00.20\newline
00.40
&
 6.50\newline
 3.04\newline
 2.18\newline
 0.76\newline
 0.33\newline
 0.43\newline
 0.28\newline
 0.24\newline
 0.05\newline
 0.05\newline
~\newline
 0.05
&
 1.96\newline
 1.53\newline
 2.83
&
 5.69\newline
 0.74\newline
~\newline
 0.25
&
 4.15\newline
 1.53\newline
 0.45\newline
 0.09\newline
 0.09\newline
 0.09\newline
 0.09\newline
~\newline
 0.09\\\hline
totals&16.01 &
13.90 &
6.32 &
6.68 &
6.58
\end{tabular}
\end{center}
\caption{
Sample of percentage of defects seen in different modules.
Note that only a very small percentage of modules have more than one defect.
For more details on these data sets, see \protect\fig{data}.
}\label{fig:pmod}
\end{figure}
