\documentclass{article}
\usepackage{graphicx}
\begin{document}

\section{Model Input Space}
\begin{tabular}{l | l | l}
input & tomi's ranges & our ranges\\\hline
reviewDocs  &10-30 &15,18,20,22,25 \\
processInspectionData  &2-10 &3,4,5,6,7 \\
automatedChecks\_A5 & &0.003,0.004,0.005,0.006,0.007 \\
captureFingerprint  &10-20 &7,9,10,11,13\\
automatedChecks\_A6 & &0.003,0.004,0.005,0.006,0.007 \\
captureFaceImage  &2-8 &2,3,5,7,8 \\
sendStoreMatchBiom & &0.0289,0.0309,0.0329,0.0349,0.0369 \\
readWriteBiomData & &0.00437,0.00537,0.00637,0.00737,0.00837 \\
scanMRTD & &0.2368,0.2708 \\
validateMRTD & &0.0082,0.0093 \\
sendGetTravInfo & &0.0068,0.0118,0.0178 \\
readPKCertData & &0.006513,0.006517 \\
readLookupData & &0.00395,0.00595,0.00795 \\
readPictureData & &0.005,0.006,0.007 \\
sendIdentifyBiom & &0.0074,0.0094,0.0114 \\
reviewDocs2  &150-450 &250,275,300,325,350 \\
processInspectionData2 & &6,8,10,12,14 \\
readWatchlistData & &20.414,22.414,24.414,26.414,28.414 \\
\end {tabular}
\section{Simulation Results}
\begin{tabular}{lllll}
                                 &\multicolumn{2}{c}{Cost}&\multicolumn{2}{c}{Queue time}\\\cline{2-5}
                                          &before & after & before & after\\\hline
median (50th percentile)                  & 2.485      & -50.975   & 41.041   & 40.952     \\
intra-quartile range (75-25th percentile) & 60.970     & 8.005     & 5.662    & 5.738       \\\hline
\end{tabular}

\begin{center}
\includegraphics{2b.pdf}
\end{center}
\section{Rules learned}

ReviewDocs2 is in (350)

\end{document}
