
  breast-cancer&      knn&    4&      &    -6&    -1\\
               &  knn+cnn&    4&      &    -1&      \\
               &  knn+mcs&     &    -9&    -5&     6\\
               &  knn+psc&   -8&   -11&   -12&      \\
\hline
          ecoli&      knn&     &   -64&   -66&   -60&   -50\\
               &  knn+cnn&  -23&   -64&   -66&   -60&   -50\\
               &  knn+mcs&  -23&   -54&   -60&   -52&   -46\\
               &  knn+psc&  -37&   -64&   -66&   -60&   -50\\
\hline
          glass&      knn&     &   -19&   -38&   -42&   -42\\
               &  knn+cnn&  -10&   -19&   -27&   -31&   -30\\
               &  knn+mcs&  -10&   -22&   -27&   -19&   -18\\
               &  knn+psc&  -24&   -45&   -51&   -50&   -50\\
\hline
         heartc&      knn&   -5&   -21&   -25&   -36&   -36\\
               &  knn+cnn&   -8&    -8&   -19&   -23&   -22\\
               &  knn+mcs&  -28&   -29&   -27&   -32&   -27\\
               &  knn+psc&  -32&   -46&   -48&   -46&   -45\\
\hline
      hepatitis&      knn&     &   -16&   -21&   -20&   -19\\
               &  knn+cnn&     &   -11&   -12&   -12&   -12\\
               &  knn+mcs&  -18&   -31&   -25&   -20&    -6\\
               &  knn+psc&  -20&   -31&   -30&   -24&   -19\\
\hline
           iris&      knn&     &   -62&   -87&  -100&  -100\\
               &  knn+cnn&   -9&   -30&   -50&   -61&   -66\\
               &  knn+mcs&   -9&   -42&   -58&   -38&   -44\\
               &  knn+psc&   -9&   -71&   -87&   -91&  -100\\
\hline
          labor&      knn&   11&      &    -8&    -9&   -12\\
               &  knn+cnn&    2&      &    -8&    -6&     \\
               &  knn+mcs&   11&   -10&   -12&   -16&     \\
               &  knn+psc&   11&   -23&    -8&   -22&   -12\\
\hline
          lymph&      knn&    1&    -9&    -8&      &      \\
               &  knn+cnn&  -10&   -13&   -15&    10&      \\
               &  knn+mcs&   -8&   -19&   -20&      &      \\
               &  knn+psc&  -18&   -35&   -30&   -10&      \\
\hline
           vote&      knn&    2&   -24&   -36&   -47&   -59\\
               &  knn+cnn&    0&    -4&    -9&   -27&   -34\\
               &  knn+mcs&  -19&   -38&   -42&   -38&   -38\\
               &  knn+psc&  -17&   -61&   -66&   -62&   -64\\
\hline
       spectra3&      knn&     &  -100&  -100&  -100&  -100\\
               &  knn+cnn&     &   -81&   -72&   -88&   -95\\
               &  knn+mcs&     &   -81&      &      &      \\
               &  knn+psc&     &  -100&  -100&  -100&  -100\\
\hline
       spectra5&      knn&     &  -100&  -100&  -100&  -100\\
               &  knn+cnn&     &  -100&  -100&  -100&  -100\\
               &  knn+mcs&     &   -75&   -66&   -25&      \\
               &  knn+psc&     &  -100&  -100&  -100&  -100\\
\hline
      spectra10&      knn&     &   -80&  -100&  -100&  -100\\
               &  knn+cnn&     &   -50&  -100&  -100&  -100\\
               &  knn+mcs&     &      &      &      &      \\
               &  knn+psc&     &  -100&  -100&  -100&  -100\\
\hline
      spectra20&      knn&     &  -100&  -100&  -100&  -100\\
               &  knn+cnn&     &  -100&  -100&  -100&  -100\\
               &  knn+mcs&     &   -50&   -66&   -66&   -50\\
               &  knn+psc&     &  -100&  -100&  -100&  -100\\
\hline
         edebug&      knn&    0&      &   -14&   -20&     0\\
               &  knn+cnn&    9&     1&   -11&   -16&    10\\
               &  knn+mcs&    1&   -13&   -19&   -20&     9\\
               &  knn+psc&    0&   -46&   -38&   -50&   -25\\
