
  breast-cancer&      knn&     &      &   -14&      &    \\
               &  knn+cnn&   -2&      &    -4&      &    \\
               &  knn+mcs&  -13&      &   -16&      &    \\
               &  knn+psc&  -18&      &   -21&      &    \\
\hline
          ecoli&      knn&     &   -75&   -75&   -66&   -68\\
               &  knn+cnn&  -37&   -75&   -75&   -66&   -68\\
               &  knn+mcs&  -43&   -60&   -65&   -52&   -62\\
               &  knn+psc&  -48&   -75&   -75&   -66&   -68\\
\hline
          glass&      knn&     &   -41&   -46&   -43&   -40\\
               &  knn+cnn&  -30&   -33&   -34&   -32&   -32\\
               &  knn+mcs&  -33&   -39&   -35&   -22&   -18\\
               &  knn+psc&  -50&   -55&   -60&   -52&   -52\\
\hline
         heartc&      knn&   -8&   -21&   -30&   -35&   -34\\
               &  knn+cnn&   -8&   -10&   -18&   -17&   -21\\
               &  knn+mcs&  -30&   -30&   -26&   -30&   -23\\
               &  knn+psc&  -33&   -46&   -46&   -46&   -42\\
\hline
      hepatitis&      knn&     &    -9&   -28&   -11&   -16\\
               &  knn+cnn&     &    -5&   -20&     5&     5\\
               &  knn+mcs&   -9&   -42&   -43&    -6&    -3\\
               &  knn+psc&  -11&   -28&   -46&   -20&   -16\\
\hline
           iris&      knn&    0&   -64&   -85&  -100&  -100\\
               &  knn+cnn&  -11&   -27&   -45&   -59&   -65\\
               &  knn+mcs&  -10&   -50&   -55&   -36&   -43\\
               &  knn+psc&   -7&   -75&   -83&   -91&  -100\\
\hline
          labor&      knn&   11&      &   -13&   -20&   -16\\
               &  knn+cnn&     &      &    -8&   -11&      \\
               &  knn+mcs&   11&    -7&   -13&   -17&   -16\\
               &  knn+psc&   11&   -19&   -20&   -27&   -16\\
\hline
          lymph&      knn&    8&   -10&   -29&   -10&    -8\\
               &  knn+cnn&   -3&    -7&   -18&   -12&     3\\
               &  knn+mcs&     &   -10&   -33&   -16&   -13\\
               &  knn+psc&   -6&   -22&   -37&   -30&   -13\\
\hline
           vote&      knn&    4&   -19&   -39&   -50&   -55\\
               &  knn+cnn&    0&    -8&   -14&   -23&   -34\\
               &  knn+mcs&  -15&   -40&   -39&   -34&   -37\\
               &  knn+psc&  -16&   -59&   -66&   -65&   -63\\
\hline
       spectra3&      knn&     &  -100&  -100&  -100&  -100\\
               &  knn+cnn&     &   -80&   -75&   -85&   -95\\
               &  knn+mcs&     &   -64&      &      &      \\
               &  knn+psc&     &  -100&  -100&  -100&  -100\\
\hline
       spectra5&      knn&     &  -100&  -100&  -100&  -100\\
               &  knn+cnn&     &  -100&  -100&  -100&  -100\\
               &  knn+mcs&     &   -71&   -42&   -12&      \\
               &  knn+psc&     &  -100&  -100&  -100&  -100\\
\hline
      spectra10&      knn&     &   -90&  -100&  -100&  -100\\
               &  knn+cnn&     &   -85&  -100&  -100&  -100\\
               &  knn+mcs&     &      &      &      &      \\
               &  knn+psc&     &  -100&  -100&  -100&  -100\\
\hline
      spectra20&      knn&    0&  -100&   -80&  -100&   -83\\
               &  knn+cnn&  -25&  -100&   -80&  -100&   -83\\
               &  knn+mcs&    0&   -50&   -40&   -66&   -33\\
               &  knn+psc&     &  -100&   -80&  -100&   -83\\
\hline
         edebug&      knn&    3&   -24&   -41&   -51&   -30\\
               &  knn+cnn&    1&    -4&   -21&   -36&   -17\\
               &  knn+mcs&  -27&   -42&   -43&   -43&   -24\\
               &  knn+psc&  -34&   -47&   -52&   -53&   -32\\
