\scriptsize
\begin{tabular}{cc}
	\resizebox{60mm}{!}{
	\begin{tabular}{|ccc|c|}
		\hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
		\hline
	        which2 & 68.1 & & \boxplot{0.0}{57.4}{68.1}{71.5}{10} \\
			micro20 & 64.7 & $=$ & \boxplot{0.0}{48.9}{64.7}{69.9}{19.2} \\
	        micro30 & 61.0 & $=$ & \boxplot{0.0}{54.2}{61.0}{69.3}{12.7} \\
	        micro75 & 61.0 & $=$ & \boxplot{0.0}{16}{61.0}{67.7}{14.3} \\
	        micro50 & 61.0 & $=$ & \boxplot{0.0}{16}{61.0}{67.7}{14.3} \\
	        micro100 & 61.0 & $=$ & \boxplot{0.0}{16}{61.0}{67.7}{14.3} \\
		\hline
	\end{tabular}
	} &
	\resizebox{60mm}{!}{
	\begin{tabular}{|ccc|c|}
        \hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
        \hline
                which2 & 76.0 & & \boxplot{71.4}{2.4}{76.0}{78.0}{3.8} \\
				micro20 & 75.1 & $<$ & \boxplot{1.9}{68.4}{75.1}{76.2}{3.9} \\
                micro50 & 74.2 & $=$ & \boxplot{5.0}{66.1}{74.2}{76.3}{4.8} \\
                micro75 & 73.7 & $<$ & \boxplot{1.0}{69}{73.7}{74.7}{3.9} \\
                micro100 & 73.3 & $>$ & \boxplot{1.0}{70.4}{73.3}{76.0}{3} \\
                micro30 & 73.0 & $<$ & \boxplot{1.9}{14.8}{73.0}{75.5}{4.5} \\
        \hline
		\end{tabular}
	} \\
	cm1 & kc1 \\
	&\\
	\resizebox{60mm}{!}{
	\begin{tabular}{|ccc|c|}
        \hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
        \hline
                which2 & 81.6 & & \boxplot{65.6}{10.4}{81.6}{84.6}{3.9} \\
                micro75 & 77.9 & $<$ & \boxplot{67.3}{8}{77.9}{80.3}{9} \\
                micro100 & 77.8 & $=$ & \boxplot{67.3}{8}{77.8}{80.3}{9} \\
                micro50 & 77.6 & $=$ & \boxplot{62.3}{8}{77.6}{83.1}{5.6} \\
                micro20 & 74.8 & $<$ & \boxplot{61.1}{10.5}{74.8}{79.4}{9} \\
                micro30 & 74.8 & $>$ & \boxplot{61.0}{9.2}{74.8}{83.2}{6.4} \\
        \hline
	\end{tabular}
	} &
	\resizebox{60mm}{!}{
	\begin{tabular}{|ccc|c|}
        \hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
        \hline
                which2 & 62.4 & & \boxplot{35.8}{21.6}{62.4}{70.8}{12.5} \\
                micro75 & 55.9 & $=$ & \boxplot{0.0}{49.8}{55.9}{64.7}{13.5} \\
                micro100 & 55.9 & $=$ & \boxplot{0.0}{49.8}{55.9}{64.7}{13.5} \\
                micro50 & 55.7 & $=$ & \boxplot{0.0}{49.8}{55.7}{64.1}{14.1} \\
                micro30 & 55.7 & $=$ & \boxplot{0.0}{49.8}{55.7}{64.1}{14.1} \\
                micro20 & 55.7 & $=$ & \boxplot{0.0}{44.1}{55.7}{64.0}{14.5} \\
        \hline
	\end{tabular}
	} \\
	kc2 & mw1mod \\
	&\\
	\resizebox{60mm}{!}{
	\begin{tabular}{|ccc|c|}
        \hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
        \hline
                which2 & 65.0 & $=$ & \boxplot{0.0}{0}{65.0}{71.1}{10.7} \\
				micro20 & 64.4 & $=$ & \boxplot{0.0}{51}{64.4}{68.9}{9.7} \\
				micro30 & 59.7 & $=$ & \boxplot{0.0}{4.1}{59.7}{64.1}{6.9} \\
                micro50 & 55.1 & $=$ & \boxplot{0.0}{11.4}{55.1}{66.2}{14.3} \\
                micro75 & 50.0 & $=$ & \boxplot{0.0}{0}{50.0}{64.5}{16} \\
                micro100 & 50.0 & $=$ & \boxplot{0.0}{0}{50.0}{64.5}{16} \\
        \hline
	\end{tabular}
	} &
	\resizebox{60mm}{!}{
	\begin{tabular}{|ccc|c|}
        \hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
        \hline
                which2 & 87.3 & & \boxplot{73.3}{9.1}{87.3}{90.5}{4.9} \\
                micro75 & 77.9 & $=$ & \boxplot{52.8}{15.2}{77.9}{81.1}{14.1} \\
                micro50 & 77.9 & $=$ & \boxplot{52.8}{15.2}{77.9}{81.1}{14.1} \\
                micro100 & 77.9 & $=$ & \boxplot{52.8}{15.2}{77.9}{81.1}{14.1} \\
                micro30 & 78.0 & $<$ & \boxplot{52.8}{17.6}{78.0}{81.1}{14.1} \\
                micro20 & 76.3 & $=$ & \boxplot{56.0}{13.8}{76.3}{81.4}{13.2} \\
        \hline
	\end{tabular}
	} \\
	pc1 & kc3mod \\
	&\\
	\resizebox{60mm}{!}{
	\begin{tabular}{|ccc|c|}
        \hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
        \hline
                micro20 & 57.1 & & \boxplot{0.0}{6.3}{57.1}{67.8}{13.9} \\
                micro30 & 17.8 & $<$ & \boxplot{0.0}{6}{17.8}{61.3}{19.1} \\
				micro75 & 6.9 & $<$ & \boxplot{0.0}{0}{6.9}{53.7}{18.8} \\
                micro50 & 6.4 & $<$ & \boxplot{0.0}{0}{6.4}{53.7}{18.8} \\
                micro100 & 6.4 & $=$ & \boxplot{0.0}{0}{6.4}{53.7}{18.8} \\
                which2 & 0.0 & $<$ & \boxplot{0.0}{0}{0.0}{40.8}{58.9} \\
        \hline
	\end{tabular}
	} &
	\resizebox{60mm}{!}{
	\begin{tabular}{|ccc|c|}
        \hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
        \hline
                which2 & 40.4 & & \boxplot{0.0}{20.6}{40.4}{51.7}{48.5} \\
                micro30 & 38.0 & $=$ & \boxplot{0.0}{0.4}{38.0}{54.5}{22.7} \\
                micro20 & 38.0 & $=$ & \boxplot{0.0}{0.4}{38.0}{54.5}{22.7} \\
                micro75 & 35.2 & $=$ & \boxplot{0.0}{0.4}{35.2}{54.5}{22.7} \\
                micro50 & 35.2 & $=$ & \boxplot{0.0}{0.4}{35.2}{54.5}{22.7} \\
                micro100 & 35.2 & $=$ & \boxplot{0.0}{0.4}{35.2}{54.5}{22.7} \\
        \hline
	\end{tabular}
	} \\
	mc2mod & ar3 \\
	&\\
	\resizebox{60mm}{!}{
	\begin{tabular}{|ccc|c|}
        \hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
        \hline
                which2 & 58.6 & & \boxplot{33.6}{16}{58.6}{66.0}{12.6} \\
                micro75 & 49.2 & $<$ & \boxplot{0.1}{38.4}{49.2}{56.4}{22.2} \\
                micro50 & 49.2 & $=$ & \boxplot{0.1}{38.4}{49.2}{56.4}{22.2} \\
                micro30 & 49.2 & $=$ & \boxplot{0.1}{38.4}{49.2}{56.4}{22.2} \\
                micro20 & 49.2 & $=$ & \boxplot{0.1}{38.4}{49.2}{56.4}{22.2} \\
                micro100 & 49.2 & $=$ & \boxplot{0.1}{38.4}{49.2}{56.4}{22.2} \\
        \hline
	\end{tabular}
	} &
	\resizebox{60mm}{!}{
	\begin{tabular}{|ccc|c|}
        \hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
        \hline
                micro75 & 77.6 & & \boxplot{31.6}{18.3}{77.6}{87.1}{12.9} \\
                micro50 & 77.6 & $=$ & \boxplot{31.6}{18.3}{77.6}{87.1}{12.9} \\
                micro30 & 77.6 & $=$ & \boxplot{31.6}{18.3}{77.6}{87.1}{12.9} \\
                micro20 & 77.6 & $=$ & \boxplot{31.6}{18.3}{77.6}{87.1}{12.9} \\
                micro100 & 77.6 & $=$ & \boxplot{31.6}{18.3}{77.6}{87.1}{12.9} \\
                which2 & 67.6 & $=$ & \boxplot{0.0}{44.2}{67.6}{80.4}{19.6} \\
        \hline
	\end{tabular}
	} \\
	ar4 & ar5 \\
\end{tabular}
\normalsize