\resizebox{60mm}{!}{
\begin{tabular}{|ccc|c|}
        \hline
        \textbf{learner} & \textbf{mean} & \textbf{Equal} & \textbf{Description} \\
        \hline
                which2 & 70.9 & & \boxplot{0.0}{52.5}{70.9}{79.5}{20.7} \\
                micro20 & 67.0 & $<$ & \boxplot{0.0}{50}{67.0}{75.9}{24.1} \\
				micro100 & 65.0 & $<$ & \boxplot{0.0}{47.1}{65.0}{76.4}{23.6} \\
                micro30 & 64.1 & $=$ & \boxplot{0.0}{47.5}{64.1}{75.5}{24.5} \\
                micro50 & 64.8 & $=$ & \boxplot{0.0}{47.1}{64.8}{76.4}{23.6} \\
                micro75 & 64.1 & $=$ & \boxplot{0.0}{43}{64.1}{75.6}{24.4} \\
        \hline
\end{tabular}
}