16.5 16.55 16.6 16.65 16.7 16.75 16.8 16.85 10

11

12

13

14

15

16

17

18

1 2 34567 8 9 10

11 121314 15 16

17

18

19

20 2122 23 24 25

26

27

28 29 3031 3233 34

35

36

37 38 39404142 43

44

45

46474849505152 53

54

55 56 5758596061 62

63

64656667686970

71 72 73 74 75767778 79

80

8182838485868788

89

909192939495969798991001011021 2 34567 8 9 10 11 1213 1415 16 17

18

1920

212223 25 26

27

28 29 303132 33 34 35

36

37 38 39404142 43 44

45

4647

4849 505152 53

54

55 56 5758596061 62

63

64656667686970 71 7273

74

7576777879

80

81828384858687 88

89 90919293949596979899100101102

Logged Bias Values

Logged Variance Values desharnaisL2 Bias-Variance Plots for 102 Methods. Dotted squares are for 3Way and dashed squares are for LOO.