To demonstrate the current state of the {\W}2 system, we ran a series of trials comprised of tests similar to the ones performed previously, as well as several tests designed to reveal more information about the way {\W}2 performs across a multitude of situations and conditions.

\input{fig1.tex}

\subsection{Basic Testing}

In order to establish a frame of reference against which to compare any subsequent results, we began by running {\W}2 through a series of tests similar to what had been tried before. The results in figure 1 can be said to be similar to what has been obtained previously. More specifically, for osp and osp2, the results were numerically rather close. Additionally, we explored the same 4 dataset/project combinations collecting information  from 60 trials as opposed to just 30.
