\begin{figure}[!t]
\begin{center}
\includegraphics[width=3.2in]{data/ares/strategic/osp2-Energy.pdf} 
\includegraphics[width=3.2in]{data/ares/strategic/osp2-Defects.pdf} 
\includegraphics[width=3.2in]{data/ares/strategic/osp2-Effort.pdf} 
\includegraphics[width=3.2in]{data/ares/strategic/osp2-Threat.pdf}   

{\scriptsize
\begin{tabular}{r|r@{~=~}l}
X& feature & range\\\hline
1&automated analysis&6\hey\\
2&peer reviews&6\\
3&execution testing and tools&6\hey\\
4&ltex&5\\
5&prec&5\\
6&pmat&5\\
7&peer reviews&5\\
\end{tabular}
}
\end{center}
\caption{Strategic analysis: OSP2 results. Note the policy point being at X=7.}\label{fig:ares}
\end{figure}

