\begin{biography}[{\includegraphics[width=0.8in,keepaspectratio]
{john/john_hinkle}}]{John Hinkle}
John C. Hinkle is a career NASA Civil Servant at the NASA IV\&V
currently managing NASA's largest IV\&V project  the International
Space Station.  He has over 33 years experience in software
engineering, program management, and IV\&V principally in large,
real-time command and control systems both with the Department of
Defense and with NASA.  Mr. Hinkle architected and ran the NASA
IV\&V program upon creation of the IV\&V Facility in 1994.
\end{biography}
