VassarStats Printable Report 2x3 Factorial ANOVA for Independent Samples Mon Jun 04 2007 18:03:20 GMT-0400 (EDT)

Values entered:

B1 B2

A1 111 7 238 24 205 156 27 6 156 98 101 17 392 44 183 149

140 9 265 40 253 196 37 6 173 123 102 17 415 59 184 175 A2 109 10 305 26 252 283 28 7 196 140 102 17 510 41 187 274

140 7 347 44 325 333 96 9 225 155 102 17 526 59 195 300 Table of Means: Cells, Rows, Columns, and Total

B1 B2 Rows

A1 119.625 137.125 128.375

A2 155.4375 180 167.7188

Columns 137.5313 158.5625 148.0469

ANOVA SUMMARY

Source SS df MS F P bg 32043.4219 3 rows 24766.8906 1 24766.891 1.48 0.228539 columns 7077.0156 1 7077.016 0.42 0.519409 r x c 199.5156 1 199.516 0.01 0.920678 wg 1000895.4375 60 16681.591 Total 1032938.8594 63 bg = between groups; wg = within groups (error)

Home Click this link only if you did not arrive here via the VassarStats main page.